10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

10^3 10^4

H1 CC e^+p 99-00 Ρs=320GeV

Preliminary 94-97 Ρs=300GeV

H1 97 PDF Fit yΛ0.9

Q^2 /GeV^2 dσ/dQ^2 /pb GeV^{-2}

0 0.5 1 1.5 2 2.5

10^3 10^4 Q^2 /GeV^2

Data/SM

SM uncertainty

0 0.5 1 1.5 2 2.5

10^3 10^4 Q^2 /GeV^2

Data/SM

H1 94-00 combined Preliminary