H1 Preliminary

0 0.2 0.4 0.6 0.8

10^3 10^4 x=0.25 xu_v

0 0.2 0.4 0.6

10^3 10^4 x=0.25 xd_v

0 0.1 0.2 0.3 0.4

10^3 10^4 x=0.4 xu_v

0 0.05 0.1 0.15

10^3 10^4 x=0.4

Q^2 (GeV^2) xd_v

0 0.02

0.04

0.06

10^3 10^4 x=0.65

Q^2 (GeV^2) xu_v

H1 94-00 combined NLO QCD Fit: H1 only H1 97 PDF Fit CTEQ5M MRST