0 250 500 750 1000

1250

1500

1750

2000

2250

0 10 20 30 0 200 400 600 800 1000

1200

1400

1600

0 50 100 150

0 200 400 600 800 1000

20 40 60 80

E´_e [GeV] events

H1 Data NC + BG BG

θ_e [°] events

E-P_Z [GeV] events

H1 Positron Data 99/00

90 GeV^2 Λ Q^2 Λ 900 GeV^2 , 0.63 Λ y Λ 0.9, E´_e ≥ 6 GeV

Fake positron background subtracted using wrong charge candidates