H1 PRELIMINARY 98 + 99 e^– p

Q^2 = 15000GeV^2

Q^2 = 30000 GeV^2

M_e (GeV) y_e

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

60 80 100 120 140 160 180 200 220 240 260