0

20

40

60

80

2.8 3 3.2 3.4 3.6 3.8

M_{μμ} [GeV]

Events

H1 prel.

1 Λ |t| Λ 5 GeV^2

0 5 10 15 20 25

2.8 3 3.2 3.4 3.6 3.8

M_{μμ} [GeV]

Events

H1 prel.

|t| Γ 5 GeV^2