1

10

10^2

60 80 100 120 140 160

W [GeV] σ(γp 5 J/ψX) [nb]

H1 Preliminary

1 Λ |t| Λ 5 GeV^2 |t| Γ 5 GeV^2

Fit W^δ, δ=0.92 +/- 0.30 Fit W^δ, δ=1.15 +/- 0.55