0

0.05

0

1

0

0.05

0

1

0

0.05

0

1

0

0.05

10 10^2 0

1

x_{IP} F_2^{D(3)}(x_{IP},β,Q^2)

β = 0.4 H1 preliminary

F_2(x,Q^2)

x_{IP}=0.001 , x=0.0004

x_{IP}=0.003 , x=0.0012

x_{IP}=0.01 , x=0.004

Q^2 ΜGeV^2Ν

x_{IP}=0.03 , x=0.012

F_2 ^{D(3)} (x_{IP},β,Q^2) H1 prel. F_2 (x,Q^2) H1 96-97