0 0.05

0 0.05

0 0.05

0 0.05

0 0.2 0.4 0.6 0.8 1

x_{IP} F_2^{D(3)}

Q^2=15 GeV^2 H1 preliminary x_{IP}

0.001

0.003

0.01

β 0.03

H1 data (prel.) QCD fit (IP+IR) QCD fit (IP)