0 0.02

0.04 β = 0.04

H1 preliminary, x_{IP} Λ 0.01 H1 preliminary, x_{IP} Γ 0.01

ρ^{D(3)}

β = 0.1 β = 0.2 β = 0.4 β = 0.65

8.5 β = 0.9 (x 5)

Q^2 ΜGeV^2Ν

0 0.02

0.04

17.5

0 0.02

0.04 30

0 0.02

0.04

10^2 10^2 10^2 10^2 10^2 10^2

60

W ΜGeVΝ