0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0 10 20 30 40 50 60 70 80

Q^2 (GeV^2) f_{LN}

E_T ^{jet} > 6 GeV -1 < η^{jet} < 2

20% normalization error not shown