1 1.2 1.4 1.6 1.8 2 2.2 2.4

4 5 6 7 8 9

DIS H1 PRELIMINARY

MLLA (DIS)

DIFF MLLA (DIFF)

Q (GeV) ξ_{peak}

Q (GeV) ξ_{width}

0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2

4 5 6 7 8 9