(GeV) γγm 0 0.05 0.1 0.15 0.2 0.25 0.3

entries

0 20 40 60 80 100 120 140 H1 data, preliminary γ 4 →_2

Signal MC: a γ 4 →_2

Signal MC: f Background MC

sample γ H1 Odderon Search - 4