) (GeV) 0π( Recoil m 0 0.2 0.4 0.6 0.8 1 1.2 1.4

entries

0 20 40 60 80 100 120 140 H1 data, preliminary γ 5 →_1

Signal MC: b

Background MC

sample γ Pomeron Channel - 5