(GeV) 0πωm 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

events

0 5 10 15 20 25 30 35 40 45 H1 data, preliminary γ 5 →_1

Signal MC: b Background MC

sample γ Pomeron Channel - 5