)^2

|t| (GeV

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

entries

1

10

10^2

10^3

H1 data, preliminary

-b|t|

= Ae d|t| dN -2 GeV syst 0.5 ± _{stat} 1.2 ± b = 10.5

sample γ Pomeron Channel - 3