0

50

100

150

200

250

300

350

400

0 0.5 1 1.5 2 2.5 0

50

100

150

200

250

300

350

400

0 0.5 1 1.5 2 2.5

η^{jet} dσ/dη^{jet} ΜpbΝ

0 0

H1 Data energy scale uncertainty

0.1 ≤ y ≤ 0.9 Q^2 ≤ 1 GeV^2 incl. k_T algor.

NLO NLO (1+δ_{hadr.})

H1 preliminary

21 ≤ E_T^{jet} ≤ 35 GeV

35 ≤ E_T^{jet} ≤ 52 GeV (x 8)

52 ≤ E_T^{jet} ≤ 75 GeV (x 24)