1 10 10^2

10^3

σ_r^{D(3)} / σ_r

β=0.011 β=0.013 β=0.017 β=0.020 β=0.027

1 10 10^2

10^3 β=0.032 β=0.043 β=0.050 β=0.067 β=0.080

1 10 10^2

10^3 β=0.107 β=0.130 β=0.167 β=0.200 β=0.267

1 10 10^2

10^3

10 10^2 β=0.320

10 10^2 β=0.433

10 10^2 β=0.500

10 10^2 β=0.667

10 10^2

Q^2 ΜGeV^2Ν

β=0.800

x_{IP}=0.0003 x_{IP}=0.001 x_{IP}=0.003 x_{IP}=0.01 x_{IP}=0.03

H1 97 σ_r^D (prel.) / H1 96-97 σ_r Fit (a + b log Q^2)

H1 preliminary