0.05

0.05

0.05

10 10^2

x_{IP} F_L^{D(3)}

x=3.2E-05 , β=0.0107

x_{IP} = 0.003 H1 preliminary

x=0.00032 , β=0.1067

Q^2 ΜGeV^2Ν

x=0.002 , β=0.6667

F_L^D (from NLO QCD Fit) F_2^D