1

1.1

1.2

1.3

1.4

1 10 10^2

Q^2 ΜGeV^2Ν α_{IP}(0)

soft IP

Inclusive

H1 F_2 96-97 Diffractive

H1 F_2^{D(3)} 94 H1 F_2^{D(3)} 97 (prel.)

Effective α_{IP}(0)