0.02

0.04

0.06

0.08 0.1

σ_r^{D(3)} / f_{IP}(x_{IP})

Q^2=6.5 GeV^2 Q^2=8.5 GeV^2 Q^2=12 GeV^2 Q^2=15 GeV^2

0.02

0.04

0.06

0.08 0.1 Q^2=20 GeV^2 Q^2=25 GeV^2 Q^2=35 GeV^2

10^{-2} 10^{-1} β

Q^2=45 GeV^2

0.02

0.04

0.06

0.08 0.1

10^{-2} 10^{-1}

Q^2=60 GeV^2

10^{-2} 10^{-1}

Q^2=90 GeV^2

10^{-2} 10^{-1}

Q^2=120 GeV^2

x_{IP}=0.0003 x_{IP}=0.001 x_{IP}=0.003 x_{IP}=0.01

H1 97 (prel.) yΛ0.6 H1 97 (prel.) yΛ0.6; M_XΛ2 GeV H1 2002 σ_r^D NLO QCD Fit (F_L^D=0)

H1 preliminary