0.05

0.05

0.05

0.05

0.05

0.05

0.05

0.05

10 10^2

x_{IP} σ_r^{D(3)}

x=8E-05 , β=0.0267

x_{IP} = 0.003 H1 preliminary

x=0.00013 , β=0.0433

x=0.0002 , β=0.0667

x=0.00032 , β=0.1067

x=0.0005 , β=0.1667

x=0.0008 , β=0.2667

x=0.0013 , β=0.4333

Q^2 ΜGeV^2Ν

x=0.002 , β=0.6667

H1 97 (Ρs=300 GeV, prel.) Dipole model (G-B,W) qq(T) qq(L) qqg