0 200 400 600

0 1

0 200 400

0.5 1 1.5 2

10

10^2

0 2 4 6 8 10 0 50 100 150 200

-1 0 1

10^3

10^4

0.01 0.02 0.03

H1 Diffractive D^*

Total Cross Section σ ΜpbΝ

H1 Data H1 2002 σ_r^D QCD Fit (prel.) H1 Fit 2 H1 Fit 3

log_{10}Q^2 ΜGeV^2Ν dσ/dlog_{10}Q^2 ΜpbΝ p*_{T,D*} ΜGeVΝ dσ/dp*_{T,D*} Μpb/GeVΝ η_{D*} dσ/dη_{D*} ΜpbΝ x_{IP} dσ/dx_{IP} ΜpbΝ log_{10}β dσ/dlog_{10}β ΜpbΝ

0 50 100 150 200 250

-2.5 -2 -1.5 -1 -0.5