10^{-1}

1

10

10^2

10^3

1 10

W = 95 GeV

H1 ρ electroproduction

Q^2 [GeV^2] σ (γ^*p 5 ρp) ΜnbΝ

H1 preliminary H1 96 ZEUS 95

σ ~ (Q^2+m^2_ρ)^{-n} ; n = 2.60 Α 0.04