10^{-1}

1

10

10^2

10^3

10^{-2} 10^{-1} 1 10 10^2

W^2=75000GeV^2 x2

W^2=60000GeV^2 x4

W^2=36000GeV^2 x8

W^2=22600GeV^2 x16

W^2=13500GeV^2 x32

W^2=9000GeV^2 x64

W^2=6000GeV^2

x128

W^2=3600GeV^2

x256

W^2=2260GeV^2

x512

W^2=1350GeV^2

x1024

W^2=900GeV^2

x2048

Q^2ΜGeV^2Ν

F_2(W^2,Q^2)/Q^2

H1 Collaboration

H1 svtx00 prel. H1 97 ZEUS BPT97

Fractal Fit (xΛ0.01) ALLM97 H1 QCD fit

Q^2 _{min} = 3.5 GeV^2