[pb/GeV] μ,μ /dM inelσd

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

10_{H1 DATA (Prelim.)}

SM (GRAPE)

[GeV] μ,μM 20 40 60 80 100 120

SM σ) / SMσ -σ(

-1 0 1 2 3

X) μμ e → H1 Muon Pair Analysis (ep