\documentclass[12pt]{article}   

\newlength{\dinwidth}
\newlength{\dinmargin}
\setlength{\dinwidth}{21.0cm}
\textheight23.5cm \textwidth16.0cm
\setlength{\dinmargin}{\dinwidth}
\setlength{\unitlength}{1mm}
\addtolength{\dinmargin}{-\textwidth}

\setlength{\dinmargin}{0.5\dinmargin}
\oddsidemargin -1.0in
\addtolength{\oddsidemargin}{\dinmargin}
\setlength{\evensidemargin}{\oddsidemargin}
\setlength{\marginparwidth}{0.9\dinmargin}
\marginparsep 8pt \marginparpush 5pt
\topmargin -42pt
\headheight 12pt
\headsep 30pt \footskip 24pt
\parskip 3mm plus 2mm minus 2mm
\bf
\begin{document}
\bf

\pagestyle{empty}

\begin{center}
  \begin{tabular}{|l|c|c||c|c|} 
\multicolumn{2}{l}{\Large \bf  H1 Preliminary $115$~pb$^{-1}$} &
\multicolumn{3}{r}{\Large \bf  Multi-electron Analysis} \\ [0.2cm] \hline
\hline
   Selection   & DATA  &  SM &  GRAPE &  NC-DIS + Compton \\ \hline \hline
 Visible 2e            &   105 &  $118.2\pm  12.8$ &  $ 93.3\pm  11.5$ &  $ 25.0\pm   5.5$ \\
 Visible 3e             &    16 &  $ 21.6\pm   3.0$ &  $ 21.5\pm   3.0$ &  $  0.1\pm   0.1$ \\
 Visible 4e or more               &     0 &  $  0.1\pm   0.0$ &  $  0.1\pm   0.0$ &  $  0.0\pm   0.0$ \\
   \hline
 $\gamma\gamma \rightarrow e^+e^-$ subsample      &    41 &  $ 48.3\pm   6.1$ &  $ 46.4\pm   6.1$ &  $  1.9\pm   0.9$ \\
   \hline

%   Selection   & DATA  &  SM &  GRAPE &  NC-DIS & Compton \\ \hline \hline
% Visible 2e              &   122 &  $118.2\pm  12.4$ &  $ 93.3\pm  11.5$ &  $ 19.2\pm   4.3$ &  $  5.8\pm   1.6$ \\
% Visible 3e              &    18 &  $ 21.6\pm   3.0$ &  $ 21.5\pm   3.0$ &  $  0.1\pm   0.1$ &  $  0.0\pm   0.0$ \\
% Visible 4e or more      &     0 &  $  0.1\pm   0.0$ &  $  0.1\pm   0.0$ &  $  0.0\pm   0.0$ &  $  0.0\pm   0.0$ \\
% $\gamma-\gamma$ sample        &    46 &  $ 48.3\pm   6.1$ &  $ 46.4\pm   6.1$ &  $  1.9\pm   0.9$ &  $  0.0\pm   0.0$ \\
%   \hline


 \end{tabular}


\end{center}

\end{document}