\documentclass[12pt]{article}   

\newlength{\dinwidth}
\newlength{\dinmargin}
\setlength{\dinwidth}{21.0cm}
\textheight23.5cm \textwidth16.0cm
\setlength{\dinmargin}{\dinwidth}
\setlength{\unitlength}{1mm}
\addtolength{\dinmargin}{-\textwidth}
\setlength{\dinmargin}{0.5\dinmargin}
\oddsidemargin -1.0in
\addtolength{\oddsidemargin}{\dinmargin}
\setlength{\evensidemargin}{\oddsidemargin}
\setlength{\marginparwidth}{0.9\dinmargin}
\marginparsep 8pt \marginparpush 5pt
\topmargin -42pt
\headheight 12pt
\headsep 30pt \footskip 24pt
\parskip 3mm plus 2mm minus 2mm
\bf
\begin{document}
\large
\bf

\pagestyle{empty}

\begin{center}

  \begin{tabular}{|c|c|c|} 
\multicolumn{2}{l}{\Large \bf  H1 Preliminary $115$~pb$^{-1}$} &
\multicolumn{1}{r}{\Large \bf  Multi-electron Analysis} \\ [0.2cm] \hline
   Selection   & DATA  &  SM \\ \hline \hline
 Visible 2e   $M(12)>100$ &     3 &  $ 0.25\pm  0.05$ \\
 Visible 3e   $M(12)>100$ &     3 &  $ 0.23\pm  0.04$ \\
   \hline
 \end{tabular}

\end{center}

\end{document}