0

1

2

3

10^3 10^4

HERA I H1

e^−p Neutral Current Ρs^¬=318 GeV

Q^2 (GeV^2) dσ/dQ^2 / dσ^{SM}/dQ^2

0.95 1 1.05 1.1 1.15

10^2 10^3 10^4