10^{-3}

10^{-2}

10^{-1}

0 0.2 0.4 0.6 0.8 1 1.2 fit region

H1 data fit elastic p-diss. non-res.

ΒtΒ ΜGeV^2Ν

1/σ´ dσ/dt