0

100

200

1.7 1.8 1.9 2 2.1

m(Kπ) [ GeV/c^2 ]

[ candidates / 20 MeV/c^2 ]

D^o → K^-π^+ untagged

H1 prel Fit

Fit composition:

Gaussian signal wrong charge combinations exponential background