0 20 40 60 80

1.7 1.8 1.9 2 2.1 m(KKπ) [ GeV/c^2 ]

[ candidates / 20 MeV/c^2 ]

D^+_s → Φπ^+→ (K^+K^-) π^+ H1 prel Fit

0

20

40

60

1 1.05 1.1 m(KK) [ GeV/c^2 ]

[ candidates / 4 MeV/c^2 ]

H1 prel Fit