0

0.05

10^{-4} 10^{-3} 10^{-2} 10^{-4} 10^{-3} 10^{-2}

x_{IP} σ_r^{D(3)}

β=0.04

x_{IP}

β=0.4

6.5

Q^2 ΜGeV^2Ν

H1 preliminary

H1 99 (Ρs=319 GeV, prel.) H1 97 (Ρs=301 GeV, prel.) IP only

H1 2002 σ_r^D NLO QCD fit (prel.)