0

200

400

600

0.2 0.4 0.6 0.8 1

H1 Diffractive γp Dijets

H1 Preliminary correl. uncert.

H1 2002 Fit (prel.) H1 Fit 2

z_{IP}^{jets} dσ/dz_{IP}^{jets} (pb)