0

0.2

0.4

0.6

-2.2 -2 -1.8 -1.6

H1 Diffractive γp Dijets

H1 Preliminary energy scale uncert. H1 2002 fit (prel.) α_{IP}(0)=1.4 α_{IP}(0)=1.08 Reggeon

log_{10}(x_{IP})

1/σ dσ/dlog_{10}(x_{IP})