0

50

100

150

200

250

0.001 0.002 0.003 0.004

H1 Forward Jet Data

x dσ/dx(nb)

H1 data, prel.

NLO DISENT

CASCADE J2003-1 CASCADE J2003-2

p_{T,JET}Γ3.5 GeV