)+NLL+PC Fits 2 sα NLO(

H1 preliminary

stat. and exp. syst. errors

Q >20GeV

world average

cτ

τ

B

0ρ

C

)0_Z

(m_sα

0.11 0.12 0.13

=2 GeV) Iμ(_0α

0.40

0.45

0.50

0.55

0.60