10^{-3}

10^{-2}

10^{-1}

1

0 0.5 1 1.5 2

H1 Preliminary

strip

+/- g_d strip + g_d strip - g_d

z(m)

|Current| (arbitrary units)

z(m)

Current (arb.)

-g_d g_d -0.05 0 0.05

0.8 1