[GeV] t~M 180 200 220 240 260 280

[GeV] b~M

100 120 140 160 180 200 Excluded in part of parameter space Excluded < 1.2 rad b ~θ , _t~θ

0.6 rad < < 1000 GeV μ 400 GeV < = 1000 GeV 2M = 10 β tan

= 0.3

131’λ

H1 preliminary

b)