H1 PRELIMINARY

10^{-3}

10^{-2}

10^{-1}

10^{-3} 10^{-2} 10^{-1} 1 x quark fraction

H1 Preliminary

Q^2= 200 GeV^2 H1 PDF 2000 10^{-3}

10^{-2}

10^{-1}

10^{-2} 10^{-1} 1

H1 Preliminary f^{cc} _ f^{bb} _ ZEUS f^{cc} _

Q^2= 650 GeV^2 x