-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65

H1 Diffractive Dijets (prel.)

DIS NLO 0.5Λμ_r/E*^{,jet1}Λ2 T

y

Data/NLO

DIS

γp

W=165 GeV W=242 GeV data bin correlated uncertainty H1 2002 fit (prel.)