eP -1 -0.5 0 0.5 1

(pb) CCσ

0

10

20

30

40

50 Xν→p +e

2 > 400 GeV 2Q y < 0.9

H1 Data )^{-1}

= 0 (L=65.2pb eP )^{-1}

= 0.33 (prelim., L=15.3pb eP )^{-1}

= -0.40 (prelim., L=21.7pb eP H1 PDF 2000 Linear Fit