0.07

0.08

0.09 0.1

0.2

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

80 90 100 110 120 130 140 150

M_H (GeV) h^{L,R}_{eμ}

H1 limits on left- and right-handed couplings h^L , h^R_{eμ eμ}

Excluded by CDF, h^L_{eμ}

Excluded by LEP h^{L,R}_{eμ}

H1 Preliminary

BR(H5 eμ)=100Ψ

0.07

0.08

0.09 0.1

0.2

0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

80 90 100 110 120 130 140 150