(GeV) ππM 0.6 0.7 0.8 0.9 1 1.1

)^{-1}

(GeV ππ /dM σ dσ1/

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18

H1 Preliminary Fit (Breit-Wigner)

0.007 GeV ± = 0.771 ρM 0.029 GeV ± = 0.180 ρΓ

Y) ρ→ pγ H1 Preliminary (

2 < 0.01 GeV 2Q 75 < W < 95 GeV 2 1.5 < |t| < 10.0 GeV < 5 GeV YM