)^2

|t| (GeV

1 2 3 4 5 6 7 8 9 10

)^{-2} / d|t| (GeV σ dσ1/

-4 10

-3 10

-2 10

-1 10

1

2 < 0.01 GeV 2Q 75 < W < 100 GeV < 5 GeV YM

Y) ρ→ pγ H1 Preliminary (

H1 Preliminary Poludniowski et al. -n Fit with |t|

+0.07 -0.05

0.07 ± n = 4.41