Y) ρ→ pγ H1 Preliminary (

*θ cos -1 -0.5 0 0.5 1

*θ /dcos σ dσ1/

0

0.05

0.1

0.15

0.2

0.25

2 1.5 < |t| < 2.2 GeV *θ cos -1 -0.5 0 0.5 1

*θ /dcos σ dσ1/

0

0.05

0.1

0.15

0.2

0.25

2 2.2 < |t| < 3.5 GeV

*θ cos -1 -0.5 0 0.5 1

*θ /dcos σ dσ1/

0

0.05

0.1

0.15

0.2

0.25

2 3.5 < |t| < 10.0 GeV

H1 Preliminary Fit SCHC