-0.5 0 0.5 1 1.5 2

10^{-2} 10^{-1} 1 10

Q^2 ΜGeV^2Ν

R=σ_L/σ_T

0.1 1 10

H1 prelim. ZEUS MRT(CTEQ6M)

H1