0

50

100

150

200

50 100 150 200 250 300

W_{γp} ΜGeVΝ σ(γp → J/ψp) ΜnbΝ

H1 prelim. ZEUS

〈Q^2〉 = 0.05 GeV^2

FMS (CTEQ4L, λ=4) Fit H1