S 0K Entries 190135 Mean 0.4959 RMS 0.02182 / ndf

2χ 361.7 / 93 N 430±

1.425e+05 M 0.0000 ± 0.4961 1σ 0.000074 ± 0.007061 r 0.0094 ± 0.5519 2σ 0.00021 ± 0.01747 a 16.7± 693.8 b 31.5±

-765.4

0.42 0.44 0.46 0.48 0.5 0.52 0.54 0.56 0.58 0 2000

4000

6000

8000

10000

12000

0 [GeV] ππM

N/2 MeV

data Fit