1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8 0 20 40 60 80 100 120 140 160 180

))[GeV] pp(_S^0 M(K

N/5 MeV

2 < 20 GeV 2 10 < Q

H1 preliminary

H1 data bgr fit