Δχ^2=1 H1 fit M_H=120 GeV Δχ^2=1 H1 fit M_H=300 GeV m_t world average M_W world average

H1 Preliminary

m_t (GeV)

M_W (GeV)

80.25

80.5

80.75

81

81.25

81.5

81.75

82

82.25

60 80 100 120 140 160 180 200 220

80.25

80.5

80.75

81

81.25

81.5

81.75

82

82.25